Title: Identify automatic transmission and transaxle components and configurations, including torque converter automatic, dual-clutch automatic (DCT), continuously variable transmission (CVT), and xEV drive.
Course: Automotive Technology I (MLR 2-Year Program) (20104-I) > Section: AUTOMATIC TRANSMISSION and TRANSAXLE: General

Identification should include

- vehicle repair information on transmission and transaxle components
- the type of drive-train system (e.g., front wheel, rear wheel, all-wheel drive, four-wheel drive).

Process/Skill Questions:

- What is the difference between all-wheel drive and four-wheel drive?
- What are the advantages and disadvantages of each type of drive-train system?