Title: Retrieve and record on-board diagnostics, DTCs, monitor status, and freeze-frame data; clear codes and data when directed.
Course: Automotive Technology I (MLR 2-Year Program) (20104-I) > Section: SUSPENSION AND STEERING: General

Retrieval and recording could include using either

- a compatible scan tool with CAN capability
- or a PC and/or tablet with equivalent interface.

Process/Skill Questions:

- Where is the DLC located on the vehicle?
- Why is it important to review and record freeze-frame data where applicable?