Title: Syllabus
Course: Medical Laboratory Technology I (14102-I)

Copyright 2021

Virginia Assignment Code: 8377

Suggested Grade Level: 11, 12

Duration: 36 weeks

Prerequisites: None

Course Description:

Medical Laboratory Technology I gives students an overview of the clinical lab, hematology, urinalysis, and clinical chemistry. Students gain foundational knowledge and skills appropriate for a variety of medical-related career paths in the field of medical laboratory technology. They are introduced to diagnostic and therapeutic laboratory procedures that support medical practice and research, and investigate safety, quality assurance, and ethical concerns associated with the field of medical laboratory technology.

Note: This course has specific state laws and regulations from a governing medical board or agency. Please contact the Virginia Department of Education, Office of Career and Technical Education prior to implementing this course. All inquiries may be sent to cte@doe.virginia.gov.