Title: Perform preventive maintenance for laptops and other mobile devices.
Course: Computer Networking Hardware Operations I (10101-1) > Section: Exploring Laptops and Other Mobile Devices

Performance should include common preventive maintenance techniques for laptops and other mobile devices.