Title: Identify classifications of drawings.
Course: Carpentry I (17003-I) > Section: Reading Blueprints

Identification should include types of plans, including

- civil
- architectural
- structural
- mechanical
- plumbing.

Process/Skill Questions:

- To which drawing would you refer to find out about doors and windows?
- Which drawing would you use to find the location of the house on the property?

NCCER Carpentry Standards

Level One, Module Four (27104-13): Introduction to Construction Drawings, Specifications, and Layout

Module Four (27104-13) describes the information contained in construction drawings, including foundation, floor, and other plan view drawings, as well as how to read them. It also describes how to interpret schedules and specifications, and how to use the 3-4-5 rule to square buildings.

NCCER Core Curriculum: Introductory Craft Skills, 2015

00105-15 Introduction to Construction Drawings

Module Five (00105-15) provides trainees with the information and skills needed to read and understand construction drawings. This module includes a set of four oversize drawings, which is included as an Appendix in the Trainee Guide. The drawings are also available for download from www.nccerirc.com.