Title: Apply various lighting instruments and lighting techniques.
Course: Video and Media Technology (11055) > Section: Production: Using Video Production Equipment

Application should include

- demonstrating a basic three-point lighting setup
- identifying lighting techniques and conditions that warrant their use
- choosing the lighting technique that suits the production's overall concept or conditions.

Process/Skill Questions:

- What are the different lighting instruments used in production?
- How are the different lighting instruments used?
- What maintenance is required for lighting instruments?