Title: Identify testing skills/strategies for a certification examination.
Course: Sterile Processing Technician II > Section: Preparing for Industry Certification

Identification should include

- conducting an Internet research project
- reviewing materials from exam and practice-exam publishers
- interviewing certified instructors/professionals.

Process/Skill Questions:

- Where are practice exams found?
- How do you determine the content used for exam questions?