Title: Prepare the work area for sterile storage.
Course: Sterile Processing Technician II > Section: Demonstrating Sterile Storage and Inventory Management

Preparation should include

- identifying the supplies needed
- abiding by the dress code
- following work area requirements
- locating instructions
- adhering to rationale for placement of instrument containers.

Process/Skill Questions:

- Why should you avoid placing containerized items on top of blue-wrapped items?
- Where should sterile instruments be taken after they have been placed in an operating room with a patient but not used?