Title: Develop fitting/material lists based on drawings.
Course: Plumbing I (17058-I) > Section: Reading Drawings for the Plumbing Profession

Development should include using addition and subtraction of decimals, fractions, and an ability to convert decimals to fractions.

Process/Skill Questions:

- Why is a fitting/material list important to a plumber?
- How are fitting/material lists used to determine the costs, and therefore, the cost effectiveness of jobs?