Title: Explain emergency first aid procedures.
Course: Welding III (13207-III) > Section: Applying Basic Safety Standards

Explanation should include procedures for accidents involving

- bodily fluids
- electrical injuries
- eye injuries
- falls
- burns

according to standard first aid and school policies.

Process/Skill Questions:

- What are the steps that should be followed in the event of an accident?
- Why is knowing cardiopulmonary resuscitation (CPR) an important skill within the electrical trades?
- Why is it important to be certified to administer first aid?
- What are the different classifications (degrees) of electrical burns?