Title: Maintain workstations, equipment, software, and supplies.
Course: Computer Information Systems, Advanced (10005-IV) > Section: Maintaining, Managing, and Troubleshooting Systems

Maintenance includes following established procedures for the

- start-up and shutdown of computers
- care of the computer equipment
- use of software, including opening and closing software
- use of supplies, storage of supplies, and disposal of waste and recyclable items
- installation of and upgrades to antivirus software.