Title: Explain safe working practices around electrical hazards.
Course: Cabinetmaking I (17007-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Explanation should include

- identifying equipment used to test electrical circuits
- describing safe working conditions
- demonstrating safe work habits

according to industry standards and instructor's guidelines.

Process/Skill Questions:

- What is the definition of proximity work?
- What are safe working clearances according to the National Electric Code (NEC)?
- What are some examples of safe working conditions and safe working habits?
- What is the unseen hazard with electrical work?

Common Career Technical Core

AC-CST5

Apply practices and procedures required to maintain jobsite safety.

AC-CST9

Safely use and maintain appropriate tools, machinery, equipment and resources to accomplish construction project goals.

AC3

Comply with regulations and applicable codes to establish and manage a legal and safe workplace.