Title: Interpret scale.
Course: Cabinetmaking I (17007-I) > Section: Interpreting Plans

Interpretation should include a variety of scales (i.e., 1/4", 1/2", 3/4", 1 ½", and 3") to be performed measure-to-scale and scale-to-measurement.

Process/Skill Questions:

- What factors determine the scale used on a drawing?
- How many scales are on the scale rule?

Common Career Technical Core

AC1

Use vocabulary, symbols and formulas common to architecture and construction.

AC6

Read, interpret and use technical drawings, documents and specifications to plan a project.