Title: Demonstrate safe working practices around electrical hazards.
Course: Welding II (13207-II) > Section: Applying Basic Safety Standards

Demonstration should include

- safe working conditions
- safe work habits.

Process/Skill Questions:

- What is the definition of proximity work?
- What are safe working clearances, according to the National Electrical Code?
- What is the unseen hazard with electrical work?