Title: Perform safety inspections of all GTAW equipment and accessories.
Course: Welding II (13207-II) > Section: Demonstrating Gas Tungsten Arc Welding (GTAW)

Performance should include a visual inspection of the following GTAW equipment and accessories on a daily basis, in accordance with instructor or employer policy:

- Regulator
- Hoses
- Welding leads (e.g., gun, torch, work cable)

Process/Skill Questions:

- How tight should the backing cap be on a GTAW torch?
- What happens when the collet is installed in the collet body backwards?
- What must be inspected on a water-cooled torch before welding?