Title: (Optional) Identify minor external repairs to all OFC track burner equipment and accessories.
Course: Welding II (13207-II) > Section: Demonstrating Oxyfuel Gas Cutting (OFC Track Burner)

Identification should include minor repairs to OFC track burner equipment and accessories (e.g., hoses, gauges, tip), in accordance with manufacturer recommendations, school policies, and instructor guidelines.

Process/Skill Questions:

- How should the torch tip be cleaned?
- How does one check a flashback arrestor?
- What are common maintenance issues encountered?
- Why should one use the proper components for the gas being used?
- Why is it important to make sure the regulators are working properly?
- Why is it important to make sure the OFC track is free of debris?