Title: (Optional) Perform safety inspections of all OFC track burner equipment and accessories.
Course: Welding II (13207-II) > Section: Demonstrating Oxyfuel Gas Cutting (OFC Track Burner)

Performance should include a visual inspection of the following OFC track burner equipment and accessories on a daily basis, in accordance with instructor or employer policy:

- Hoses
- Cords
- Gauges

Process/Skill Questions:

- Why is it not acceptable to leave a running machine unattended?
- Why is it important to check for leaks?
- What is the purpose of a dry run?
- Why must all electrical cords be checked for damage?