Title: Inspect hand and power tools to ensure safety and usability.
Course: Welding II (13207-II) > Section: Applying Basic Safety Standards

Inspection should include

- verifying that components of machinery (e.g., guards, blades, moving parts, start/stop switches) are in good working condition
- identifying any defects in tools, parts, or functions
- adhering to standard safety procedures (i.e., lab practices and manufacturer recommendations)
- demonstrating the safe operation and use of all welding equipment, tools, and machines.

Process/Skill Questions:

- What are some of the basic power tools used in construction?
- Why should a power tool always be grounded?
- What are the steps to take before using an electrical angle grinder?
- What are the dangers of running a grinder wheel over its rated RPM?