Title: Inspect PPE to determine whether it is safe to use.
Course: Welding II (13207-II) > Section: Applying Basic Safety Standards

Inspection should include determining whether items are clean, unexpired, and safe to use.

Process/Skill Questions:

- What are some dangerous effects of exposure, and how can one significantly prevent these effects?
- Why is wearing jewelry prohibited while in the lab or on the job site?