Title: Maintain a safe working environment.
Course: Welding II (13207-II) > Section: Applying Basic Safety Standards

Maintenance should be ongoing and result in identifying potential hazards on a job site or in the lab, such as unstable or improperly erected scaffolding, electrical hazards, job-site debris, improperly stored materials, and air quality hazards. When present, hazards must be remedied by appropriate measures and in compliance with school and instructor guidelines.

Process/Skill Questions:

- What are some examples of job-site hazards?
- Why is it important to maintain a safe workspace on a job site?
- Why is it important to store materials and tools in their proper place?