Title: (Optional) Repair a manual starter.
Course: Small Engine Repair (20110-36) > Section: Repairing Manual Starters

Repair should include

- accessing starter parts
- evaluating missing/broken parts
- distinguishing a worn assembly from a repairable assembly
- replacing or repairing an assembly and/or components
- reassembling the starter
- following manufacturer’s specifications, industry-recommended practices, and instructor guidelines.

Process/Skill Questions:

- Where is a manual starter located on a small engine?
- When does a manual starter need repair or replacement?
- What are some common causes of a pull rope not returning to its original position?
- How is a manual starter assembled?