Title: (Optional) Evaluate the reed valve for proper operation.
Course: Small Engine Repair (20110-36) > Section: Repairing Valves on Two-Stroke Engines

Evaluation should meet the minimum requirements based on manufacturer’s specifications, industry-recommended practices, and instructor guidelines

Process/Skill Questions:

- What would one look for to determine whether a reed valve is in good working order?
- How can one tell whether a valve is malfunctioning while the engine is running?
- What effect will a bad valve have on compression?