Title: Connect a fire department pump to a water supply.
Course: Firefighting I (15152-I) > Section: Using Water Supply, Hoses, and Nozzles

Connecting should include using the appropriate supply hose (i.e., soft sleeve or hard sleeve).

Process/Skill Questions:

- What is the dry-hydrant system?
- When should the low-level strainer be used?
- What pump accessory is needed to remove air from the suction hose?