Title: Maintain a transmitter log.
Course: Radio Communications I (11051-I) > Section: Performing Broadcast Engineering

Maintenance should include

- operating parameters
- power output
- antenna system
- tower light check
- Emergency Alert System (EAS) tests.

Process/Skill Questions:

- Why is it necessary to keep a transmitter log?
- What happens to a station if the log is not updated on time?
- Who is responsible for updating the log?