Title: Identify emergency first-aid procedures.
Course: Precision Machining Technology II (13204-II) > Section: Ensuring Industrial Safety and Environmental Protection

Identification should include standard first-aid procedures and school policies regarding incidents involving

- bodily fluids
- electrical injuries
- eye injuries
- falls
- burns.

Process/Skill Questions

- What are the steps that should be followed after an accident?
- Why is knowing cardiopulmonary resuscitation (CPR) an important skill in the construction trades?
- Why is it important to be certified to administer first aid?

- Where might one locate the Automated External Defibrillator (AED) in a machine shop?
- What are the different degrees of electrical burns?