Title: Organize radiographs.
Course: Dental Careers II (14054-II) > Section: Performing Radiographic Procedures

Organization should include identifying the patient’s name, tooth number, and date, and placing each radiograph in a full mouth series in the proper position in a mount or template.

Process/Skill Questions:

- Why is it important for the dental assistant to recognize anatomical landmarks?
- Why is organization of radiographs critical?