Title: Demonstrate the use of administrative dental office technologies.
Course: Dental Careers II (14054-II) > Section: Performing Administrative Functions

Demonstration should include

- operating specific dental EHR technologies

  - appointment scheduling

- practice management software

  - payment entries
  - communication software and hardware

- charting, treatment notes, treatment planning

- transferring patient records (with encryption)
- using translation software
- operating office equipment (e.g., copy machine, document scanner, adding machine, FAX machine).

Process/Skill Questions:

- How is an appointment scheduled for a specific operator?
- How is information for the day backed up?
- Why is it important to have user identification systems?