Title: Perform battery state-of-charge test; determine needed action.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Batteries (Low Voltage)

Performance should include referencing service materials and following manufacturer guidelines.

Process/Skill Questions:

- When should a battery state-of-charge test be performed? How often?
- What type of acid is in a lead/acid battery?
- What types of batteries are available?