Title: Confirm battery capacity, size, type, and application for vehicle; perform battery capacity and load test as recommended by manufacturer.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Batteries (Low Voltage)

Procedures should include

- identifying the type of battery (absorbed glass mat, gel, maintenance-free, flooded/wet lead-acid)
- exploring the load and high-rate discharge
- referring to service materials and manufacturer guidelines.

Process/Skill Questions:

- Where is the cold cranking amperage (CCA) rating found?
- Should a frozen battery be tested? Why or why not?
- What tools are used to perform the battery capacity test?