Title: Inspect and clean battery cables, connectors, clamps, and hold-downs.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Batteries (Low Voltage)

Procedures should include

- cleaning the battery case and terminals
- replacing the battery by disconnecting and reconnecting specified battery size (group number) with respect to polarity
- replacing cables by using the same or a larger gauge than is specified by the manufacturer replacing connectors, clamps/terminals, and with same-as-original equipment.

Process/Skill Questions:

- What materials are found in most battery clamps?
- What precautions should be taken when servicing a battery?
- What product(s) can neutralize battery acid?