Title: Perform engine oil and filter change.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: ENGINE REPAIR: Lubrication and Cooling Systems

Performance should include

- using fluid type per manufacturer specification
- resetting maintenance reminder as required
- following manufacturer guidelines.

Process/Skill Questions:

- How should the proper oil and correct amount be determined when adding oil to a particular vehicle?
- What are the steps for changing the oil and filter?
- What safety steps should be followed when changing the oil?
- What are the fluid types, weights, and ratings of oil?