Title: Perform cooling system pressure and dye tests to identify leaks; check coolant condition and level; inspect and test radiator, pressure cap, coolant reservoir/recovery tank, heater core, and galley plugs.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: ENGINE REPAIR: Lubrication and Cooling Systems

Performance should include

- using a pressure tester
- using a refractometer or test strips
- conducting a visual inspection.

Process/Skill Questions:

- What are the procedures for conducting a cooling system pressure test?
- What tools are needed to perform a cooling system pressure test?
- What is the function of a coolant recovery tank?