Title: (Optional) List the equipment required for intubation.
Course: Emergency Medical Technician III (14055-III) > Section: Assisting an Advanced Life Support (ALS) Provider with Advanced Procedures

List should include

- curved or straight blade
- stylet
- endotracheal or supraglottic tubes and holders
- tube placement confirmation devices
- bag-valve-mask
- suction unit or catheter
- endotracheal tube inducer.

Process/Skill Questions:

- How is the technique used for a curved laryngoscope blade different from that used for a straight blade?
- What are the possible complications that could result from improper tube placement?
- What are the similarities and differences among adult, child, and infant bag-valve-masks?