Title: Inspect track bar, strut rods/radius arms, and related mounts and bushings.
Course: Automotive Technology I (20104-I) > Section: Suspension and Steering Systems: Related Suspension and Steering Service

Inspection should be conducted visually, according to state inspection procedures, using specialized tools according to manufacturer guidelines.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
IV. Suspension and Steering Systems
B. Related Suspension and Steering Service
Task 11

Process/Skill Questions:

- What are some methods of preserving alignment when servicing strut rods and bushings?
- Why is inspection important?
- How do strut rods and bushings affect caster and braking?
- Will a bent strut rod cause a vehicle to pull? Explain.