Title: Demonstrate use of precision measuring tools (i.e., micrometer, dial-indicator, dial-caliper).
Course: Automotive Technology I (20104-I) > Section: Required Supplemental Tasks: Tools and Equipment

Demonstration should include using and reading

- outside and inside micrometers
- plastigage
- dial-indicator tool
- feeler gauge
- vernier caliper
- depth micrometer.

Process/Skill Questions:

- When are precision measuring tools required?
- What factors can influence precision measurement devices? In what ways?
- How does one know if the measuring equipment is functioning properly?