Title: Explain the history of the grid.
Course: Introduction to Energy Transmission and Distribution I (20902-36) > Section: Understanding the Electrical Grid

Explanation should include

- the contributions of Thomas Edison and Nikola Tesla
- alternating current (AC) vs. direct current (DC)
- long-distance vs. local transmission
- single-phase vs. three-phase power.

Process/Skill Questions:

- What is a basic explanation for the Niagara power project?
- What are some of Edison’s greatest contributions to the grid?
- What is the impact of Tesla’s work on today’s transmission and distribution grid?