Title: Install the power supply.
Course: Computer Systems Technology I (10002-I) > Section: Assembling a Personal Computer

Installation should include various mounting methods.

Process/Skill Questions:

- What precautionary steps should be taken when installing the power supply?
- How can an A+ certified technician open a power supply to fix it?
- What factors must be considered when replacing a computer’s power supply unit?