Title: Configure a WPA2 enterprise WLAN on the WLC.
Course: Computer Networking Hardware Operations III (10101-III) > Section: Implementing WLAN

Configuration includes a WLC WLAN to use a VLAN interface, a DHCP server, and a WPA2 enterprise authentication.