Title: Demonstrate knowledge of mechanical system operation.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Demonstration confirms an understanding of the physical laws governing mechanical systems, phenomena such as transmission of force and energy and control of energy, and components of mechanical systems. The student should also demonstrate an understanding of maintenance measures that ensure trouble-free operation.

Process/Skill Questions:

- What role does the control of energy play in the operation of mechanical systems?
- What are the primary components of mechanical systems?