Title: Apply preventive maintenance measures for mechanical systems.
Course: Industrial Maintenance Technology II (13203-II) > Section: Maintaining Systems

Application increases the operational life of the equipment and includes

- an understanding of preventive maintenance’s purpose
- knowledge of which equipment parts require regular checks
- attention to safety issues
- adherence to an analysis guide
- production of an inspection report.

Process/Skill Questions:

- By how much does regular maintenance extend the life of typical mechanical systems?
- Which parts of a mechanical system require service most often?