Title: Perform a urinalysis.
Course: Veterinary Science II (18105-II) > Section: Understanding Laboratory Procedures

Performance should include

- explanation of the purpose of a urinalysis
- explanation of the methods for collection
- description of the collection of urine samples, using one or more methods.
- explanation of the characteristics used to evaluate samples according to industry standards
- evaluation of the simulated/synthetic urine samples according to industry standards
- description of common abnormalities.

Process/Skill Questions:

- What are the different methods that can be used to collect samples for urinalysis?
- What are the consequences of improper handling of urine samples?
- What is the purpose of a urinalysis, and what can the results indicate about patient health?
- What common abnormalities can be seen in a urinalysis?
- What universal precautions and PPE are needed for sample collection and handling?
- What microscopic findings might be seen when performing a urinalysis?
- What is the purpose of a centrifuge?
- What is the purpose of the refractometer?
- What is the assistant’s role in cystocentesis?
- Which pets frequently “get blocked”?
- What physical characteristics of the urine sample need to be recorded during the urinalysis?

Teacher Resources:

- Carolina Knowledge Center (https://knowledge.carolina.com/)
- Innovating Science® Urinalysis Using Simulated Urine Individual Student Science Kit (https://www.enasco.com/p/Innovating-Science%C2%AE-Urinalysis-Using-Simulated-Urine-Individual-Student-Science-Kit%2BNE30080)