Title: Comply with safety and ergonomic precautions associated with computer use.
Course: Computer Information Systems, Advanced (10005-IV) > Section: Maintaining, Managing, and Troubleshooting Systems

Compliance should include using computer-related items that ensure personal and equipment safety such as

- surge protectors and uninterruptible power supply (UPS)
- antistatic mats and pads
- antivirus protection software
- electric cords and wiring
- comfortably positioned furniture
- ergonomically designed keyboards.