Title: Design an engineering solution to a real-world problem for each of the areas in the designed world.
Course: Engineering Analysis and Applications II (21016) > Section: Applying the Engineering Design Process

Design should include

- researching potential solutions
- brainstorming multiple solutions
- sketching the solutions
- evaluating the design against the requirements and constraints
- justifying an optimal solution
- explaining some of the mathematical analysis that would need to be done for a realistic solution
- developing ergonomics for user interaction.

Process/Skill Questions:

- How does one demonstrate collaborative performance in designing a solution?
- How does one create a visualization for the design process and maintain accurate records of follow-through?
- How does one demonstrate decision-making and iterative approach in designing the solution?
- What is one product in each area of the designed world that has had positive consequences?