Title: Dig a clean trench.
Course: Utility/Heavy Construction II (20052-II) > Section: Using Backhoes

Digging a clean trench should be done according to all laws and regulations, including ensuring that

- the spoil pile is set at a minimum of 2 feet away from the trench
- the trench is no greater than 3 feet deep.

Process/Skill Questions:

- Where should one place the spoil pile?
- At what depth is shoring required?
- What can be done to reduce trench depth?