Title: Describe the assessment and management of patients with genitourinary/renal disorders.
Course: Emergency Medical Technician II (14055-II) > Section: Managing Medical Emergencies

Description should include the anatomy, physiology, pathophysiology, assessment, and management of

- a blood pressure assessment of a hemodialysis patient
- the complications related to renal dialysis
- the complications related to urinary catheter management (not insertion)
- kidney stones.

Process/Skill Questions:

- What is the function of the kidneys?
- What are kidney stones?
- What are some adverse effects of dialysis?