Title: Describe advantages and disadvantages of PV system configurations.
Course: Renewable Energy (17105) > Section: Exploring Solar Power Systems

Description should include

- electrical output
- load estimates
- cost of installation
- system expectations from the customer
- tax credits or incentives
- finance models (e.g., solar co-ops)
- net metering.

Process/Skill Questions:

- What are the advantages and disadvantages of a grid-tied PV system?
- What are the advantages and disadvantages of an off-grid PV system? When should someone use battery back-up in a PV system design?
- What is net metering, and how does it work in Virginia?
- What is today’s electric rate (kw/hour) and what (if any) are projected annual cost increases?