Title: Measure PV array energy output under various conditions.
Course: Renewable Energy (17105) > Section: Determining Requirements for a Photovoltaic System

Measurement should include voltage, amps, and watts (if possible).

Process/Skill Questions:

- What happens to the output of a PV array when it is exposed to different colors of light?
- What happens to the output of a PV array when the angle of light is changed?
- How does one set a multimeter to measure the output from a PV array?
- How is output affected by shading and light intensity?