Title: Compute electrical power in circuits.
Course: Electronics Systems I (17106-36) > Section: Exploring Circuits as Systems

Computation should include

- using the same value components that are physically installed in the circuit
- retaining at least three significant figures (i.e., decimal places) on all measurements
- reconciling differences between computed and measured values (often attributable to rounding errors).

Process/Skill Questions:

- Why might computed values differ from measured values?