Title: Construct series circuits.
Course: Electronics Systems I (17106-36) > Section: Constructing DC Analog Circuits

Construction should include

- using a breadboard
- designating a source and one path for current to flow
- using a conductor, a load, and a voltage source connecting components
- testing output for desired results.

Process/Skill Questions:

- How do virtual simulations compare to real-world circuits?
- What might cause a fault in a circuit?
- How is a series circuit affected by a broken path?
- Which items in the industry or at home use series circuits?