Title: Perform basic computer operations.
Course: Office Specialist I - Preparation (12004-1) > Section: Developing Keyboarding and Computer Skills

Performance should adhere to the following procedures:

- Turn on power switch on CPU/monitor and peripherals.
- Log on to a network (if appropriate).
- Select the appropriate software.
- Close the software.
- Log off and shut down.