Title: Report personal injuries and environmental and equipment safety violations to the appropriate authority.
Course: Energy and Power (20101-36) > Section: Introducing Safety and Regulations in Energy and Power

Report should include

- identifying the violation
- documenting the date when the incident or behavior was observed
- submitting the report to the instructor, supervisor, or the local OSHA inspector.

Process/Skill Questions:

- Why is it important to report injuries?
- What are common reporting procedures?
- What are the key components of a report?
- What ethical considerations might be involved when reporting coworkers?
- Why is it important to follow reporting procedures?
- What is liability?