Title: Identify emergency first-aid procedures.
Course: Energy and Power (20101-36) > Section: Introducing Safety and Regulations in Energy and Power

Identification should include standard first-aid procedures and school policies regarding incidents involving

- bodily fluids
- electrical injuries
- eye injuries
- falls
- burns.

Process/Skill Questions:

- What steps should be followed in the event of an accident?
- Why is knowing cardiopulmonary resuscitation (CPR) important?
- Why is it important to be certified to administer first aid?
- What are the different classifications (degrees) of electrical burns?