Title: Describe pipes and pressure used in the transmission of natural gas.
Course: Energy and Power (20101-36) > Section: Transmitting Electricity

Description should include the materials (e.g., steel) used in and the varying diameters (from 6 to 48 inches) of pipes used to transmit natural gas and the role of pressure in transmission.

Process/Skill Questions:

- How do the various materials used in pipes vary with regard to efficiency and with regard to maintenance?
- Where are the widest pipes used and the narrowest pipes used?