Title: Maintain a safe working environment.
Course: Electronics Technology (17101-II) > Section: Applying General Safety Standards (Core Safety)

Maintenance should be ongoing and should include

- identifying potential hazards on a jobsite or in the lab
- taking measures to remedy hazards
- complying with school and instructor guidelines.

Potential hazards include

- unstable or improperly erected scaffolding
- electrical hazards
- jobsite debris
- improperly stored materials
- air quality hazards.

Process/Skill Questions:

- What are some examples of jobsite hazards?
- Why is it important to adhere to safety standards on a jobsite?
- Why is safe storage of materials and tools important?