Title: Identify tools, their care and maintenance needs, their functions, and handling.
Course: Aviation Maintenance Technology II (20114-II) > Section: Following Tool and Equipment Safety and Care Guidelines

Identification should include

- naming hand tools, power equipment, and additional shop equipment used in aviation maintenance
- selecting the appropriate tool for the job
- following manufacturer's guidelines for cleaning, maintaining, and storing tools
- calibrating tools.

Process/Skill Questions:

- Why is tool calibration important?
- What are tools common to aviation maintenance?