Title: Fabricate, install, and test flexible fluid lines and fittings.
Course: Aviation Maintenance Technology II (20114-II) > Section: Exploring Fluid Lines and Fittings

Fabrication, installation, and testing should include

- selecting the correct hose required for application, based on fluid, pressure, and temperature
- selecting the correct fittings for the hose
- installing fittings for the application
- proofing the test hose at applicable pressure.

Process/Skill Questions:

- Why is important to select the correct hose for an application?
- How does temperature and pressure affect fluid line hose selection?