Title: Fabricate, install, and test rigid fluid lines and fittings.
Course: Aviation Maintenance Technology II (20114-II) > Section: Exploring Fluid Lines and Fittings

Fabrication, installation, and testing of rigid fluid lines and fittings should include

- selecting correct tubing required for application, based on pressure and temperature
- selecting correct fittings for tubes
- flaring bead and clamp tubes, as needed for application
- proofing test tubing at applicable pressure.

Process/Skill Questions:

- Why is it important to select the correct tubing for an application?
- How does temperature and pressure affect fluid line selection?