Title: Syllabus
Course: Aviation Maintenance Technology II (20114-II)

Copyright: 2018

Suggested Grade Level: 11, 12

Duration: 36 weeks/280 hours

Prerequisites: Aviation Maintenance Technology I (8728)

Course Description:

Students will explore design features of aircraft through drawings and blueprints. Students will investigate aircraft materials and processes, weight and balance procedures, and fluid lines and fittings. Additionally, students will learn care and maintenance techniques (such as how to identify and correct corrosion), practice lab and tool safety, and apply academic principles while working with aircraft.

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," (https://law.lis.virginia.gov/admincode/title8/agency20/chapter120/section150/) or contact the Virginia Department of Education Office of Career, Technical and Adult Education at cte@doe.virginia.gov.