Title: Explain the purpose of preventive maintenance and system security management.
Course: Computer Systems Technology I (10002-I) > Section: Examining Preventive Maintenance and Troubleshooting

Explanation should include

- increasing safety
- maintaining performance
- providing data protection
- increasing product longevity
- maintaining productivity.

Process/Skill Questions:

- How can preventive maintenance improve system performance?
- Why are Windows updates so important?
- How does optimizing the Windows registry increase system performance?