Title: Apply common preventive-maintenance techniques for OSs.
Course: Computer Systems Technology I (10002-I) > Section: Examining Preventive Maintenance and Troubleshooting

Application should include

- creating a preventive-maintenance plan
- scheduling a task
- backing up the storage device
- updating OSs and software
- storing data in the cloud.

Process/Skill Questions:

- What utilities should be run as part of regular maintenance?
- Why does fragmentation slow down a computer system?
- What is the advantage of optimizing the storage device? Why set up a schedule for that process to occur?