Title: Use a NIOSH-approved supplied air (i.e., Fresh Air Make-Up) respirator system.
Course: Auto Body Technology II (20117-II) > Section: Practicing Safety

Use should include proper maintenance in accordance with OSHA regulation 1910.134 and applicable state and local regulations.

Process/Skill Questions:

- What are examples of NIOSH-approved air respirator systems?
- What are the advantages of a fresh air ventilation system?
- What are indications that a ventilation system is in disrepair or is malfunctioning?
- Why would one ventilation system be chosen over other types of systems?