Title: Explain a systems approach to usability and human factors as it applies to health IT.
Course: Health Informatics (14157-I) > Section: Understanding Usability and Human Factors

Explanation should include

- usability
  - ease of use
  - variety of devices (e.g., cellphones, tablets)
  - common interface across applications
  - issues related to access

- human factors
  - age
  - ability (enhanced abilities with technology)
  - intuition.

Process/Skill Questions:

- What are the factors of usability in health IT?
- How can human error be a factor?
- What devices can affect usability?