Title: Follow safety guidelines.
Course: Fundamentals of Power Generation (20904-I) > Section: Exploring Health and Safety Challenges in Energy and Power

Following guidelines should include

- Occupational Safety and Health Administration (OSHA) guidelines for construction (29 CFR 1926) and general industry (29 CFR 1910)
  - personal protective equipment (PPE)
  - lockout/tagout procedures
  - confined space
  - hearing protection
  - respiratory protection
  - work permits
  - hazardous waste and materials

- manufacturer guidelines for maintenance and use of tools, shop equipment, and equipment
- maintaining lab safety
- National Electrical Code (NEC) National Fire Protection Association (NFPA 70)
- US Chemical Safety and Hazard Investigation Board (CSB) videos
- American Society of Mechanical Engineers (ASME codes)
- National Board of Boiler and Pressure Vessel Inspectors (NBBI codes).

Process/Skill Questions:

- What are examples of job site hazards?
- Why is it important to store materials and tools in their proper places?
- What is the purpose of safety data sheets (SDS)?
- What is the unseen hazard with electrical work?
- What is the definition of proximity work?
- What are minimum approach distances for qualified and nonqualified workers?
- Why is jewelry not allowed on the work site? Who is authorized to remove a lockout and tagout?