Title: Design a solar-powered model.
Course: Fundamentals of Power Generation (20904-I) > Section: Exploring Photovoltaics

Design could include

- a house, boat, or car
- a CAD 3D model
- the use of a PV panel for motor, light, or another load.

Process/Skill Questions:

- How might a solar panel lift weight using a model?
- How might a vehicle be powered using solar energy?