Title: Evaluate preventive-maintenance on security systems.
Course: Computer Systems Technology II (10002-II) > Section: Performing Security Functions

Evaluation should include

- OS updates
- performing account maintenance
- backing up data
- testing the backup data
- managing off-site storage and an in-house data library
- using an authentication policy.

Process/Skill Questions:

- What issues might be associated with OS updates?
- Why is a regular backup schedule vitally important to a network?