Title: (Optional) Identify the methods used in searching a fire scene.
Course: Forensic Technology (15055) > Section: Analyzing Forensic Aspects of Arson and Explosion Investigations

Demonstration should include

- protecting evidence, including fingerprints
- assessing and analyzing the scene, including fire origin and trail
- documenting the process
- reporting to the fire chief
- appearing in court as needed as a material witness or expert.

Process/Skill Questions:

- To whom does the fire inspector report?
- What is involved in protecting evidence at a fire scene?
- What are the main reasons for determining the cause of any fire and personal and property damage?