Title: (Optional) Plant shrubs and/or gardens.
Course: Building Management II (16103-II) > Section: Maintaining Grounds

Planting should include

- selecting tools
- testing soil and pH levels
- marking power, water, and sewer lines prior to planting
- growing plants from seed
- preparing root bulbs
- irrigating plants.

Process/Skill Questions:

- Why are soil and pH tests necessary?
- What is the significance of underground obstacles?
- What is germination?
- Why is it important to have the correct amount of irrigation for new plants?