Title: Syllabus
Course: Building Management II (16103-II)

Copyright: 2016

Course Code: 8591

Suggested Grade Level: 11, 12

Duration: 36 weeks / 280 hours

Prerequisites: 8590

Course Description:

Students obtain advanced knowledge and skills to perform the upkeep of commercial and public buildings and grounds through hands-on training in cleaning operations, building repairs, electrical work, plumbing, and grounds maintenance.

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," (https://law.lis.virginia.gov/admincode/title8/agency20/chapter120/section150/) or contact the Virginia Department of Education Office of Career, Technical and Adult Education at cte@doe.virginia.gov.