Title: Define chemical terminology related to building management.
Course: Building Management II (16103-II) > Section: Measuring and Mixing Chemicals

Defining chemical terminology used in building management should include

- caustic
- corrosive
- combustible
- drain cleaner
- flammable
- linseed oil
- refinishing supplies.

Process/Skill Questions:

- What safety precautions should be used when working with chemicals?
- What sources may be used to find out the potential hazards related to a particular chemical?
- What is the difference between caustic and corrosive?
- What is the difference between combustible and flammable chemicals?
- What are some of the dangers associated with linseed oil?