Title: Describe the assessment and management of patients with special challenges.
Course: Emergency Medical Responder (14055-IV) > Section: Managing Special Patient Populations

Description should include recognizing and reporting abuse and neglect.

Process/Skill Questions:

- Who are mandated reporters of suspected abuse and neglect?
- What are some indicators of abuse and neglect?
- How does one report suspected abuse or neglect?