Title: Comply with federal, state, and local safety legal requirements, including the Occupational Safety and Health Administration (OSHA), Virginia Occupational Safety and Health (VOSH) Program, and Environmental Protection Agency (EPA).
Course: Industrial Maintenance Technology (13203-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Compliance should include the identification of the Hazard Communication Standard (HazCom), the information included on safety data sheets (SDS), and the responsibilities of employers and employees under HazCom.

Process/Skill Questions:

- Where should hazardous materials be stored?
- What information can be found on an SDS?