Title: Perform oxyfuel cutting operations.
Course: Industrial Maintenance Technology (13203-I) > Section: Performing Welding Operations

Performance includes the ability to

- place equipment in operation
- perform minor repairs
- select proper operating pressures, tips, and filler rods
- set up and use a manual oxyfuel cutting torch to cut carbon steel.

Process/Skill Questions:

- What are the dangers of working with oxygen, and what precautions should be taken?
- What equipment must be changed when the fuel gas type is changed? Why?
- How is the proper cutting tip selected?
- What is the process for selecting a brazing rod?
- What is the difference between welding and brazing?