Title: (Optional) Develop a tool, machinery, and/or equipment maintenance plan.
Course: Agricultural Business Operations II (18201-36) > Section: Operating the Agribusiness

Development should include, but not be limited to

- tool, machinery, or equipment type
- tool, machinery, or equipment description and number
- location of tool, machinery, or equipment
- maintenance task description

Process/Skill Questions:

- What is the most important maintenance task?
- What are examples of needed maintenance? How will this change for different machinery?
- How does one determine who will be responsible for the maintenance work required?