Title: Service the fuel system.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the Fuel System

Service should include inspecting the condition of

- fuel tank
- fuel lines
- fuel filter
- evaporative emission system.

Process/Skill Questions:

- How should one dispose of used gasoline?
- How often should fuel be tested for spoilage?
- Why should a fuel system maintain good fuel pressure?
- How does ethanol affect fuel system components?