Title: Adjust controls (i.e., cables, rods, and springs).
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting Small-Engine Equipment

Adjustments should follow manufacturer's specifications and instructor's guidelines and should include

- adjusting for proper releasing
- adjusting to proper full engagement
- inspecting for any sticking or binding to impede function of related part.

Process/Skill Questions:

- Where does one find how to make control adjustments?
- What part does safety play in all adjustments?
- What types of adjusters will one find on lawn and garden equipment?