Title: Identify attic area ventilators.
Course: Carpentry II (17003-II) > Section: Installing Roofing

Identification should include the various types of attic area ventilators, including

- gable end
- soffit
- roof top
- ridge vent.

Process/Skill Questions:

- What is the function of attic ventilators?
- What are the possible consequences of not ventilating an attic?

NCCER Carpentry Standards

Level Two, Module Five (27202-13): Roofing Applications

Module Five (27202-13) describes how to properly prepare the roof deck and install roofing for residential and commercial buildings.