Title: Establish elevation points from a benchmark.
Course: Carpentry II (17003-II) > Section: Building and Installing Foundations and Forms

Establishing the elevation point should be within +/- .01 feet of the benchmark.

Process/Skill Questions:

- What is a benchmark?
- How might other points be determined from a benchmark?