Title: Describe local preconfigured response modes (e.g., BLS, ALS, full, hot or cold).
Course: Emergency Medical Telecommunications (14055-V) > Section: Determining Resource Allocation

Description should include

- Tier 1 system structures
- Tier 2 system structures
- Tier 3 system structures
- Tier 4 system structures
- hot response modes
- cold response modes
- BLS "cold"
- BLS "hot"
- ALS "hot"
- Full response.

Process/Skill Questions:

- What are the proper response modes and response configurations?
- What is the difference between a response mode and a response configuration?
- What are the four generic response configurations?