Title: (Optional) Earn the Construction Industry OSHA 10 card.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration I (17056-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Earning a Construction Industry OSHA 10 card

- will recognize that one has acquired 10 hours of safety instruction
- will help teach national standards for personal safety within a lab environment
- will validate safety skills to the industry
- will help workers become more safety conscious and responsible.

Process/Skill Questions:

- What are the benefits of earning the Construction Industry OSHA 10 card?
- What is OSHA, and how are its standards validated?
- Why was OSHA established, and how has it evolved?