Title: Inspect and test fusible links, circuit breakers, and fuses.
Course: Automotive Technology II (MLR 2-Year Program) (20104-II) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: General

Procedures should include conducting a visual inspection or using the appropriate test equipment.

Process/Skill Questions:

- How would one describe a fusible link?
- How do circuit breakers function?
- How would a technician recognize an open fuse?