Title: Identify different types of water/coolant pumps (e.g., belt-driven, chain-driven, and electric).
Course: Automotive Technology II (MLR 2-Year Program) (20104-II) > Section: ENGINE REPAIR: Lubrication and Cooling Systems

Identification should include describing components and their locations in the system of the provided vehicle.

Process/Skill Questions:

- How does the drive mechanism (e.g., belt, chain, or electric) affect the function of the water/coolant pump?
- What is the difference between chain-driven, belt-driven and electric water pumps?
- What are the advantages and disadvantages of chain-driven, belt-driven, and electric water pumps in terms of efficiency and maintenance?
- How does an electric water pump differ from a mechanical one in terms of control and power source?