Title: Identify vehicle systems which pose a safety hazard during service due to high voltage.
Course: Automotive Technology II (MLR 2-Year Program) (20104-II) > Section: Foundational Tasks: Shop and Personal Safety

Identification should include

- xEV drivetrains
- lighting systems
- ignition systems
- A/C systems
- injection systems.
- manufacturer warnings and guidelines regarding shock hazard.

Process/Skill Questions:

- What is the typical system voltage of a high-intensity discharge (HID) headlight?
- What gas is used in most HID bulbs?
- What do HID bulbs use in place of filaments?