Title: Inspect and test starter relays and solenoids.
Course: Automotive Technology II (MLR 2-Year Program) (20104-II) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Starting System (Low Voltage)

Inspection and testing should include using voltage-drop testing for a power source (i.e., available voltage) and checking the ground.

Process/Skill Questions:

- What is the function of a relay?
- What is the function of a solenoid?
- How would a technician test a relay?