Title: Inspect components of rear suspension systems (e.g., coil, leaf, and torsion beam).
Course: Automotive Technology II (MLR 2-Year Program) (20104-II) > Section: SUSPENSION AND STEERING: Suspension Systems

Inspection should include

- conducting a visual inspection, according to state inspection procedures
- using specialized tools, according to manufacturer guidelines.

Process/Skill Questions:

- What safety precautions should be taken when handling leaf springs?
- What is the purpose of the center bolt? How can it affect alignment?
- What is the purpose of the spring shackle?