Title: Inspect engine cooling and heater system hoses and pipes.
Course: Automotive Technology II (MLR 2-Year Program) (20104-II) > Section: HEATING, VENTILATION, AND AIR CONDITIONING: (HVAC): Heating, Ventilation, and Engine Cooling Systems

Procedure should include

- checking hoses for bulges, softness, leaks, and cracks
- checking hose clamps
- following service manuals and manufacturer guidelines.

Process/Skill Questions:

- What specialized tools should be required to inspect engine cooling and heater system hoses and belts?
- What procedures are used to inspect engine cooling and heater system hoses?
- What are some common failures of hoses?