Title: Make metric measurements and conversions.
Course: Industrial Maintenance Technology I (13203-I) > Section: Performing Mathematical Calculations Related to Measurement

Performance includes reading a print with metric dimensions and

- converting to inch-based measurements
- making linear measurements with metric measuring tools
- converting between metric and U.S. systems.

Process/Skill Questions:

- In what types of situations is it necessary to convert U.S. system measurements to metric?
- Why is it necessary to know how to read a print with metric dimensions?
- What are some examples of metric measuring tools?